Entries 20735 Mean 0.9372 Mean y 1.006 RMS 0.2244 RMS y 0.2491 / ndf

2χ 7120 / 46 p0 0.0003 ± 0.9007

[a. u.]

Channel 1 meas E ρ 1 2 3 4

Channel 1 meas / E Channel 1 truth E

0

1

2

3

4

±