[GeV] T genp

210^310

> T gen / p T GaussFit < p

0.9 0.92

0.94

0.96

0.98 1 1.02

1.04

1.06

1.08 1.1 < 1.3 η -1.3 <

Uncorrected CMS default Kalibri

η