HT [GeV]

0 200 400 600 800 100012001400160018002000 events

0

0.2

0.4

0.6

0.8

1

1.2

0

1

1.2 Signal LM3 total sys. uncert.

MHT [GeV]

0 100 200 300 400 500 600 700 800 900 1000 events

0

0.2

0.4

0.6

0.8

1

1.2

0

1

Signal LM3 total sys. uncert.

MET [GeV]

0 100 200 300 400 500 600 700 800 900 1000 events

0 0.2 0.4 0.6 0.8 1 1.2 1.4

0

1

Signal LM3 total sys. uncert.

Jet1Pt [GeV]

0 100 200 300 400 500 600 700 800 900 1000 events

0

0.2

0.4

0.6

0.8

1

1.2

0

1

1.2 Signal LM3 total sys. uncert.

Jet2Pt [GeV]

0 100 200 300 400 500 600 700 800 900 1000 events

0

0.5

1

1.5

2

2.5

0

1

2

Signal LM3 total sys. uncert.

Jet3Pt [GeV]

0 100 200 300 400 500 600 700 800 900 1000 events

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4

0

1

2 Signal LM3 total sys. uncert.

Jet4Pt [GeV]

0 100 200 300 400 500 600 700 800 900 1000 events

0 0.5 1 1.5 2 2.5 3

0

1

2

3 Signal LM3 total sys. uncert.